SPACE TELESCOPE SCIENCE INSTITUTE

TIPS 1

02/22/96 M. Dahlem

OBSERVING SUMMARY Jan. 13 – Feb. 16 1996:

ffl Instrument: nominal performance.

ffl Acquisition: 18 peak-up sequences and 14 binary acquisitions in total, of which 1 ACQ/BIN and 4 ACQ/PEAKs failed.

ffl Pointing: 65% within 1^{00}.

ffl Executed programs: 18 GO/GTO proposals, 4 calibration/engeneering programs.

6167 CAL/FOS FOS CYCLE 5: DARK 6206 CAL/FOS CYCLE 5 - FOS POLARIMETRY CALIBRATION 6166 CAL/FOS FOS CYCLE5: LOCATION OF SPECTRA AND WAVE- LENGTH CALIBRATION - BLUE 6236 CAL/FOS FOS CYLCE 5: LOCATION OF SPECTRA AND WAVE- LENGTH CALIBRATION - RED

ffl Other: Phase 2 support at a very high level

SPACE TELESCOPE SCIENCE INSTITUTE

TIPS 2

02/22/96 M. Dahlem

TARGET ACQUISITION FAILURES:

ffl ACQ/PEAK failures:

GO 6290 – Crab pulsar; user supported integration times too short GO 6331 – SNRs; no counts GO 6020 – SN1987A; FGS2 used subdominant; different FGS2 star than in successful earlier acquisitions CAL/FOS 6206 – BD28; FGS2 used subdominant

GO 5824 – LOL on FGS1 guide star after successful first TA stage GO 6061 – offset star acquired successfully; offset problem?

ffl ACQ/BIN failure:

GO 5853 – SNR; no counts; bad target coordinates