SPACE TELESCOPE SCIENCE INSTITUTE

Activities: 7 July - 10 August 1994

Target Acquistion Statistics:

Pointing Statistics:

Blueside: 63% Redside: 55% Total: 58%

ACQ Type Success Fail Total Comments

Binary 15 3 18 1 Target too faint 2 HST Safed Peakup 4 2 6 2 HST Safed Total 19 5 24

8/11/94 FOS Koratkar

SPACE TELESCOPE SCIENCE INSTITUTE

Science Activities:

19 GO proposals where scheduled in this month. Of these 2 proposals were for the Jupiter campaign

Calibration Activities:

5529: “Discriminator Noise”- HST Safed 5530: “Cycle 4: Ybases” - successful 5532: “Dark Monitoring” - successful 5533: “Aperture Wheel Repeatability” - successful

Delivered Post-COSTAR “Superflat” Flat Fields for high dispersion gratings only.

Other:

CAL/FOS-112 FOS Dead Diode Reference Files: A Quick Reference Guide to the Appropriate File for a Particular Date and Instrumental Configuration: C.J. Taylor CAL/FOS-113 Reference Guide and History of FOS Calibration Reference Files and Tables C.J. Taylor and C.D. Keyes Draft version.

8/11/94 FOS Koratkar

SPACE TELESCOPE SCIENCE INSTITUTE^{8/11/94}_{FOSKoratkar}

SPACE TELESCOPE SCIENCE INSTITUTE^{8/11/94}_{FOSKoratkar}